From 17842893306410f878eed66af5e807870e61cc49 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Mon, 21 Feb 2022 19:34:01 +0100
Subject: refactor: replace script tags with next/script (#10)

* refactor: replace script tags with next/script

Since next.js v12.1.0 some warnings was displayed because I was using
some script tags.

* build(deps): bump next-themes to v0.1.1
---
 src/pages/index.tsx | 10 ++++++----
 1 file changed, 6 insertions(+), 4 deletions(-)

(limited to 'src/pages/index.tsx')

diff --git a/src/pages/index.tsx b/src/pages/index.tsx
index 5621d58..0045996 100644
--- a/src/pages/index.tsx
+++ b/src/pages/index.tsx
@@ -12,6 +12,7 @@ import { settings } from '@utils/config';
 import { loadTranslation } from '@utils/helpers/i18n';
 import { GetStaticProps, GetStaticPropsContext } from 'next';
 import Head from 'next/head';
+import Script from 'next/script';
 import type { ReactElement } from 'react';
 import { useIntl } from 'react-intl';
 import { Graph, WebPage } from 'schema-dts';
@@ -193,11 +194,12 @@ const Home: NextPageWithLayout<HomePageProps> = ({
         <meta property="og:url" content={`${settings.url}`} />
         <meta property="og:title" content={pageTitle} />
         <meta property="og:description" content={pageDescription} />
-        <script
-          type="application/ld+json"
-          dangerouslySetInnerHTML={{ __html: JSON.stringify(schemaJsonLd) }}
-        ></script>
       </Head>
+      <Script
+        id="schema-homepage"
+        type="application/ld+json"
+        dangerouslySetInnerHTML={{ __html: JSON.stringify(schemaJsonLd) }}
+      />
       <div id="home">
         <HomePageContent components={components} />
       </div>
-- 
cgit v1.2.3

