From 8e0c8c9255ba5ab466d8372fe223efeb5a3f0833 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Wed, 29 Dec 2021 17:52:21 +0100
Subject: chore: replace read more link with ButtonLink component

I also fix the load more button position since I removed the margin
auto.
---
 src/pages/blog/index.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/pages/blog/index.tsx')

diff --git a/src/pages/blog/index.tsx b/src/pages/blog/index.tsx
index 23013bd..a638bd4 100644
--- a/src/pages/blog/index.tsx
+++ b/src/pages/blog/index.tsx
@@ -55,6 +55,7 @@ const Blog: NextPageWithLayout<BlogPageProps> = ({ fallback }) => {
         <Button
           isDisabled={isLoadingMore}
           clickHandler={() => setSize(size + 1)}
+          position="center"
         >{t`Load more?`}</Button>
       )}
     </>
-- 
cgit v1.2.3

