From 6221fa82e41915702d8139cade5c25e9d61e619f Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Mon, 2 Oct 2023 17:39:16 +0200
Subject: refactor(components): remove Column and NoScript from atoms

* Column is a simple div meant to be used inside Columns component so
they should live together.
* NoScript is only used in Layout component and its name does not
make sense since it needs to be used inside a `noscript` element.
---
 src/components/organisms/layout/site-footer.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/organisms/layout/site-footer.tsx')

diff --git a/src/components/organisms/layout/site-footer.tsx b/src/components/organisms/layout/site-footer.tsx
index c1fe9d0..d767a4d 100644
--- a/src/components/organisms/layout/site-footer.tsx
+++ b/src/components/organisms/layout/site-footer.tsx
@@ -1,6 +1,6 @@
 import type { FC } from 'react';
 import { useIntl } from 'react-intl';
-import { Copyright, Footer, type CopyrightProps } from '../../atoms';
+import { Copyright, type CopyrightProps, Footer } from '../../atoms';
 import {
   BackToTop,
   type BackToTopProps,
-- 
cgit v1.2.3

