From 6221fa82e41915702d8139cade5c25e9d61e619f Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Mon, 2 Oct 2023 17:39:16 +0200
Subject: refactor(components): remove Column and NoScript from atoms

* Column is a simple div meant to be used inside Columns component so
they should live together.
* NoScript is only used in Layout component and its name does not
make sense since it needs to be used inside a `noscript` element.
---
 src/components/organisms/layout/site-footer.test.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/organisms/layout/site-footer.test.tsx')

diff --git a/src/components/organisms/layout/site-footer.test.tsx b/src/components/organisms/layout/site-footer.test.tsx
index ffdeb7a..0d2cec2 100644
--- a/src/components/organisms/layout/site-footer.test.tsx
+++ b/src/components/organisms/layout/site-footer.test.tsx
@@ -16,6 +16,7 @@ describe('SiteFooter', () => {
   it('renders the website copyright', () => {
     render(<SiteFooter copyright={copyright} topId="top" />);
     expect(rtlScreen.getByText(copyright.owner)).toBeInTheDocument();
+    expect(rtlScreen.getByText(copyright.dates.start)).toBeInTheDocument();
   });
 
   it('renders a back to top link', () => {
-- 
cgit v1.2.3

