From a3eb518dcccaebd0f48c708c189ad2fcb07f0f73 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Sun, 21 Aug 2022 13:50:18 +0200
Subject: fix(comments): load all comments on a post

Previously, only the first 10 comments was loaded. So I update the
fetching method to retrieve all the comments on a post.
Also, I choose to order comments on client side because of a bug
with WPGraphQL.
Finally, I renamed the Comment type to SingleComment to avoid conflict
with existing types.
---
 src/components/organisms/layout/comments-list.fixture.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/components/organisms/layout/comments-list.fixture.tsx')

diff --git a/src/components/organisms/layout/comments-list.fixture.tsx b/src/components/organisms/layout/comments-list.fixture.tsx
index 2618f77..f2a1d26 100644
--- a/src/components/organisms/layout/comments-list.fixture.tsx
+++ b/src/components/organisms/layout/comments-list.fixture.tsx
@@ -1,6 +1,6 @@
-import { Comment } from '@ts/types/app';
+import { SingleComment } from '@ts/types/app';
 
-export const comments: Comment[] = [
+export const comments: SingleComment[] = [
   {
     approved: true,
     content:
-- 
cgit v1.2.3

