From 36d129414b696bd2a633d379cac1dff867f64413 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Wed, 25 May 2022 15:49:31 +0200
Subject: fix(settings): reduce font-size on small devices

With French translation, words are a little longer so I reduce the
font size on small devices to avoid line breaking.
---
 src/components/molecules/forms/motion-toggle.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/molecules/forms/motion-toggle.tsx')

diff --git a/src/components/molecules/forms/motion-toggle.tsx b/src/components/molecules/forms/motion-toggle.tsx
index cbe38fe..55ff150 100644
--- a/src/components/molecules/forms/motion-toggle.tsx
+++ b/src/components/molecules/forms/motion-toggle.tsx
@@ -9,7 +9,7 @@ import { useIntl } from 'react-intl';
 
 export type MotionToggleProps = Pick<
   ToggleProps,
-  'labelClassName' | 'value'
+  'className' | 'labelClassName' | 'value'
 > & {
   /**
    * The local storage key to save preference.
-- 
cgit v1.2.3

