From cfdddac43f10d06a8b0e9bcf69dc0ce77ce16649 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Wed, 8 Jun 2022 19:06:27 +0200
Subject: fix(settings): avoid cropped tooltip on small devices

I changed the settings disposition to make tooltip positioning easier.
Jest complains about ref passed but everything seems to work as
expected so I'm not sure it is relevant. Maybe a bug with cloneElement.
---
 src/components/molecules/forms/ackee-toggle.tsx | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'src/components/molecules/forms/ackee-toggle.tsx')

diff --git a/src/components/molecules/forms/ackee-toggle.tsx b/src/components/molecules/forms/ackee-toggle.tsx
index a666731..67a3644 100644
--- a/src/components/molecules/forms/ackee-toggle.tsx
+++ b/src/components/molecules/forms/ackee-toggle.tsx
@@ -14,7 +14,11 @@ import Tooltip, { type TooltipProps } from '../modals/tooltip';
 
 export type AckeeToggleProps = Pick<
   RadioGroupProps,
-  'bodyClassName' | 'groupClassName' | 'legendClassName'
+  | 'bodyClassName'
+  | 'buttonClassName'
+  | 'groupClassName'
+  | 'legendClassName'
+  | 'legendPosition'
 > & {
   /**
    * Set additional classnames to the toggle wrapper.
-- 
cgit v1.2.3

