From 36d129414b696bd2a633d379cac1dff867f64413 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Wed, 25 May 2022 15:49:31 +0200
Subject: fix(settings): reduce font-size on small devices

With French translation, words are a little longer so I reduce the
font size on small devices to avoid line breaking.
---
 src/components/molecules/forms/ackee-select.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/molecules/forms/ackee-select.tsx')

diff --git a/src/components/molecules/forms/ackee-select.tsx b/src/components/molecules/forms/ackee-select.tsx
index 34850fb..f00ca74 100644
--- a/src/components/molecules/forms/ackee-select.tsx
+++ b/src/components/molecules/forms/ackee-select.tsx
@@ -11,7 +11,7 @@ import SelectWithTooltip, {
 
 export type AckeeSelectProps = Pick<
   SelectWithTooltipProps,
-  'labelClassName' | 'tooltipClassName'
+  'className' | 'labelClassName' | 'tooltipClassName'
 > & {
   /**
    * A default value for Ackee settings.
-- 
cgit v1.2.3

