From 9128c224c65f8f2a172b22a443ccb4573c7acd90 Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Fri, 29 Sep 2023 15:49:14 +0200
Subject: refactor(components): rewrite ProgressBar component

* Avoid browser vendors by adding an extra div
* Add a loading state
* Add an option to center the progress bar (no longer the default)
* Remove min since it is always 0
---
 src/components/atoms/loaders/progress-bar.fixture.tsx | 5 -----
 1 file changed, 5 deletions(-)
 delete mode 100644 src/components/atoms/loaders/progress-bar.fixture.tsx

(limited to 'src/components/atoms/loaders/progress-bar.fixture.tsx')

diff --git a/src/components/atoms/loaders/progress-bar.fixture.tsx b/src/components/atoms/loaders/progress-bar.fixture.tsx
deleted file mode 100644
index d9b02c3..0000000
--- a/src/components/atoms/loaders/progress-bar.fixture.tsx
+++ /dev/null
@@ -1,5 +0,0 @@
-export const id = 'amet-eum-ut';
-export const min = 0;
-export const max = 50;
-export const current = 20;
-export const label = '20 loaded out of a total of 50';
-- 
cgit v1.2.3

