From 6221fa82e41915702d8139cade5c25e9d61e619f Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Mon, 2 Oct 2023 17:39:16 +0200
Subject: refactor(components): remove Column and NoScript from atoms

* Column is a simple div meant to be used inside Columns component so
they should live together.
* NoScript is only used in Layout component and its name does not
make sense since it needs to be used inside a `noscript` element.
---
 src/components/atoms/layout/no-script.test.tsx | 12 ------------
 1 file changed, 12 deletions(-)
 delete mode 100644 src/components/atoms/layout/no-script.test.tsx

(limited to 'src/components/atoms/layout/no-script.test.tsx')

diff --git a/src/components/atoms/layout/no-script.test.tsx b/src/components/atoms/layout/no-script.test.tsx
deleted file mode 100644
index b737d7e..0000000
--- a/src/components/atoms/layout/no-script.test.tsx
+++ /dev/null
@@ -1,12 +0,0 @@
-import { describe, expect, it } from '@jest/globals';
-import { render, screen } from '../../../../tests/utils';
-import { NoScript } from './no-script';
-
-const message = 'A noscript message.';
-
-describe('NoScript', () => {
-  it('renders a message', () => {
-    render(<NoScript message={message} />);
-    expect(screen.getByText(message)).toBeInTheDocument();
-  });
-});
-- 
cgit v1.2.3

