From 6221fa82e41915702d8139cade5c25e9d61e619f Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Mon, 2 Oct 2023 17:39:16 +0200
Subject: refactor(components): remove Column and NoScript from atoms

* Column is a simple div meant to be used inside Columns component so
they should live together.
* NoScript is only used in Layout component and its name does not
make sense since it needs to be used inside a `noscript` element.
---
 src/components/atoms/layout/column.tsx | 14 --------------
 1 file changed, 14 deletions(-)
 delete mode 100644 src/components/atoms/layout/column.tsx

(limited to 'src/components/atoms/layout/column.tsx')

diff --git a/src/components/atoms/layout/column.tsx b/src/components/atoms/layout/column.tsx
deleted file mode 100644
index 632799c..0000000
--- a/src/components/atoms/layout/column.tsx
+++ /dev/null
@@ -1,14 +0,0 @@
-import { FC, HTMLAttributes, ReactNode } from 'react';
-
-export type ColumnProps = HTMLAttributes<HTMLDivElement> & {
-  children: ReactNode;
-};
-
-/**
- * Column component.
- *
- * Render the body as a column.
- */
-export const Column: FC<ColumnProps> = ({ children, ...props }) => {
-  return <div {...props}>{children}</div>;
-};
-- 
cgit v1.2.3

