From 6221fa82e41915702d8139cade5c25e9d61e619f Mon Sep 17 00:00:00 2001
From: Armand Philippot <git@armandphilippot.com>
Date: Mon, 2 Oct 2023 17:39:16 +0200
Subject: refactor(components): remove Column and NoScript from atoms

* Column is a simple div meant to be used inside Columns component so
they should live together.
* NoScript is only used in Layout component and its name does not
make sense since it needs to be used inside a `noscript` element.
---
 src/components/atoms/layout/column.test.tsx | 13 -------------
 1 file changed, 13 deletions(-)
 delete mode 100644 src/components/atoms/layout/column.test.tsx

(limited to 'src/components/atoms/layout/column.test.tsx')

diff --git a/src/components/atoms/layout/column.test.tsx b/src/components/atoms/layout/column.test.tsx
deleted file mode 100644
index 7e747c6..0000000
--- a/src/components/atoms/layout/column.test.tsx
+++ /dev/null
@@ -1,13 +0,0 @@
-import { describe, expect, it } from '@jest/globals';
-import { render, screen } from '../../../../tests/utils';
-import { Column } from './column';
-
-const body =
-  'Non praesentium voluptas quisquam ex est. Distinctio accusamus facilis libero in aut. Et veritatis quo impedit fugit amet sit accusantium. Ut est rerum asperiores sint libero eveniet. Molestias placeat recusandae suscipit eligendi sunt hic.';
-
-describe('Column', () => {
-  it('renders the column body', () => {
-    render(<Column>{body}</Column>);
-    expect(screen.getByText(body)).toBeInTheDocument();
-  });
-});
-- 
cgit v1.2.3

